/*Table structure for table `wf_setup` */

CREATE TABLE `wf_setup` (
  `id` varchar(255) NOT NULL,
  `property` varchar(255) DEFAULT NULL,
  `value` text,
  `ordering` int(11) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

/*Data for the table `wf_setup` */

insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c0f4007b','mediumWarningLevel','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c106007c','jsonpWhitelist','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c11f007d','masterLoginUsername','admin',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c12a007e','deadlineCheckerInterval','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c13f007f','performanceAnalyzerThreshold','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c14d0080','userLocale','en_US',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c15c0081','landingPage','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c16e0082','OWASP_CSRFTOKEN','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1800083','criticalWarningLevel','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1910084','systemDateFormat','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1ab0085','dataFileBasePath','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1bf0086','fileSizeLimit','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1d80087','enableUserLocale','true',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1ee0088','systemLocale','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c1ff0089','systemTimeZone','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c224008a','customCss','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c232008b','designerwebBaseUrl','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c241008c','css','',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c250008d','masterLoginPassword','****SECURE VALUE*****',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c26d008e','deleteProcessOnCompletion','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c279008f','enableNtlm','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2830090','rightToLeft','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2950091','dateFormatFollowLocale','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2a10092','disableAdminBar','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2ab0093','disableWebConsole','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2b50094','disablePerformanceAnalyzer','false',NULL);
insert  into `wf_setup`(`id`,`property`,`value`,`ordering`) values ('4028b88163fc28580163fc73c2c20095','disableListRenderHtml','false',NULL);
